= Perforce Helix Server Deployment Package (for UNIX/Linux)
Perforce Professional Services <consulting@perforce.com>
:revnumber: v2021.1
:revdate: 2021-01-26
:doctype: book
:icons: font
:toc:
:toclevels: 5
:sectnumlevels: 4
:xrefstyle: full
// Attribute for ifdef usage
:unix_doc: true

== Preface

Welcome to the Helix Installer Test Suite.

*Please Give Us Feedback*

Perforce welcomes feedback from our users. Please send any suggestions for improving this document or the SDP to consulting@perforce.com.

:sectnums:

== Overview

Building Images

Running the Test Suite

Interacting with the Test Suite

Testing the Helix Installer

Testing the SDP

=== Requirements and One-Time Setup

