= SDP Windows to Linux Migration Guide
Perforce Professional Services <consulting@perforce.com>
:revnumber: v2023.1
:revdate: 2023-08-11
:doctype: book
:icons: font
:toc:
:toclevels: 5
:sectnumlevels: 4
:xrefstyle: full
// Attribute for ifdef usage
:unix_doc: true

== Preface

This guide documents the process for migrating a Helix Core service from Windows to Linux.

A common scenario is that an on-premisis (on-prem) Windows Helix Xoer services 

*Please Give Us Feedback*

Perforce welcomes feedback from our users. Please send any suggestions for improving this document to consulting@perforce.com.

:sectnums:
== Overview

A Migration has these elements:

* Deployment of a new Linux Server machine.
* Setup of a server spec for a Linux Replica on the Windows master.

Each of these components is covered, in detail, in this guide.

[appendix]
== Why Migrate?

EDITME - add content later.
